A Wavelet Tour of Signal Processing

Stéphane Mallat, Academic Press 1999 (2nd edition)

(a) (b)

(c) Figure 6.6: (a): Wavelet transform W f(u, s). (b): Modulus maxima of a wavelet transform computed ψ = θ^{′′}, where θ is a Gaussian with variance β = 1. (c): Decay of log_2 |W f(u, s)| along maxima curves. In the left figure, the solid and dotted lines correspond respectively to the maxima curves converging to t = 0.81 and t = 0.12. In the right figure, they correspond respectively to the curves converging to t = 0.38 and t = 0.55. The diffusion at t = 0.12 and t = 0.55 modifies the decay for s ≤ σ = 2^{−5}.