A Wavelet Tour of Signal Processing

Stéphane Mallat, Academic Press 1999 (2nd edition)

Figure 5.5: Dyadic wavelet transform W f(u, 2^j) computed at scales 2^{−7} ≤ 2^j ≤ 2^{−3} with a filter bank algorithm, for signal defined over [0, 1]. The bottom curve carries the lower frequencies corresponding to scales larger than 2^{−3}.