A Wavelet Tour of Signal Processing

Stéphane Mallat, Academic Press 1999 (2nd edition)

Figure 5.1: A windowed Fourier frame is obtained by covering the timefrequency plane with a regular grid of windowed Fourier atoms, translated by u_n = n u_0 in time and by ξ_k = k ξ_0 in frequency.