A Wavelet Tour of Signal Processing

Stéphane Mallat, Academic Press 1999 (2nd edition)

Figure 4.4: The energy spread of ĝ is measured by its bandwidth Δω and the maximum amplitude A of the first side-lobes, located at ω = ±ω_0.