A Wavelet Tour of Signal Processing

Stéphane Mallat, Academic Press 1999 (2nd edition)

Figure 4.18: Wigner-Ville distribution P_V f(u, ξ) of two Gabor atoms shown at the top. The oscillating interferences are centered at the middle timefrequency location.