A Wavelet Tour of Signal Processing

Stéphane Mallat, Academic Press 1999 (2nd edition)

Figure 4.11: (a) Normalized scalogram of the signal shown in Figure 4.3, calculated from the modulus of an analytic wavelet transform. Dark points indicate large amplitude coefficients. (b) Complex phase of the analytic wavelet transform, where the scalogram is non-zero.