A Wavelet Tour of Signal Processing

Stéphane Mallat, Academic Press 1999 (2nd edition)

(a) (b)

(c) (d)

Figure 10.8: The first row shows the wavelet modulus maxima of the noisy image 10.6(b). The scale increases from left to right, from 2^{−7} to 2^{−5}. The chains of modulus maxima selected by the thresholding procedure are shown below. The bottom image is reconstructed from the selected modulus maxima at all scales.