A Wavelet Tour of Signal Processing

Stéphane Mallat, Academic Press 1999 (2nd edition)

(a) (b)

(c) Figure 10.2: (a): Piecewise polynomial of degree 3. (b): Noisy signal degraded by a Gaussian white noise (SNR = 21.9 db). (c): Wiener estimation (SNR= 25.9 db).