A Wavelet Tour of Signal Processing

Stéphane Mallat, Academic Press 1999 (2nd edition)

Figure 10.12: Deconvolution of the signal in Figure 10.11(a) with a thresholding in a mirror wavelet basis (SNR = 29.2 db).