A Wavelet Tour of Signal Processing

Stéphane Mallat, Academic Press 1999 (2nd edition)

(a) (b)

Figure 10.10: (a): Degraded data Y , blurred and contaminated by a Gaussian white noise (SNR = 25.0 db). (b) Deconvolution calculated with a circular convolution estimator whose risk is close to the linear minimax risk over bounded variation signals (SNR = 25.8 db).