A Wavelet Tour of Signal Processing

Stéphane Mallat, Academic Press 1999 (2nd edition)

(a)

(b) Figure 6.16: Devil’s staircase calculated from a Cantor measure with equal weights p_1 = p_2 = 0.5. (a): Wavelet transform W f(u, s) computed with ψ = −θ^′, where θ is Gaussian. (b): Wavelet transform modulus maxima.